/*
  Warnings:

  - You are about to drop the `EnergyData` table. If the table is not empty, all the data it contains will be lost.
  - You are about to drop the `Site` table. If the table is not empty, all the data it contains will be lost.

*/
-- DropForeignKey
ALTER TABLE "public"."EnergyData" DROP CONSTRAINT "EnergyData_consumptionSiteId_fkey";

-- DropForeignKey
ALTER TABLE "public"."EnergyData" DROP CONSTRAINT "EnergyData_generationSiteId_fkey";

-- DropTable
DROP TABLE "public"."EnergyData";

-- DropTable
DROP TABLE "public"."Site";
